The FullScreen plugin toggles the browser's native fullscreen mode.

##### Usage

This plugin is activated via data attributes.

**Data API**

Add `data-lte-toggle="fullscreen"` to a button element. Use `data-lte-icon="maximize"` and `data-lte-icon="minimize"` on child icon elements to toggle their visibility.

```html
<button type="button" class="btn" data-lte-toggle="fullscreen">
  <i data-lte-icon="maximize" class="bi bi-arrows-fullscreen"></i>
  <i data-lte-icon="minimize" class="bi bi-fullscreen-exit" style="display: none"></i>
</button>
```

##### Events

| Event | Description |
|-------|-------------|
| `maximized.lte.fullscreen` | Fired when entering fullscreen mode. |
| `minimized.lte.fullscreen` | Fired when exiting fullscreen mode. |

##### Notes

- Requires browser support for the Fullscreen API (`document.fullscreenEnabled`).
- The maximize icon is hidden when in fullscreen mode, and the minimize icon is shown (and vice versa).
